Nuestra Señora de la Concepcion de Vico
edition published: 2016-05-09-04:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Nuestra Señora de la Concepcion de Vico; Nuestra Señora de; Vico; nuestra señora de la concepcion de vico
location: Lima, Huanuco, Jarama y Chinchacocha, Yaros, Chaupe, Guarangas yaros chaupe guarangas, Nuestra Señora de la Concepcion de Vico
location: Peru, Pasco, Pasco, Vicco
location: -10.84110651 -76.23612556
location: -10 50 27.98520 -076 14 10.05360
Levillier 1921-26 v9 203
Levillier 1921-26 v9 203
AGI Lima 464
identifier: http://logarandes.org/place/117
1
Google sat
Kohut
12/8/2015
0