Sant Saluador de Puquina
edition published: 2018-04-05-04:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Sant Saluador de Puquina
location: -16.62550 -71.18439
Probablemente LOGAR confunde San Bernardo de Omate (R387) con Sant Saluador de Puquina (R388) y localiza aquel en el lugar de este.
AGI Lima 464 28r
identifier: http://logarandes.org/place/559