Nuestra Señora de Ongoy
edition published: 2016-05-09-04:00
language: en
availability: Distributed under a Creative Commons Attribution 3.0 Unported License. (http://creativecommons.org/licenses/by/3.0/)

Nuestra Señora de Ongoy; Nuestra Señora de; Ongoy; nuestra señora de ongoy
location: Lima, Cuzco, Andaguaylas, Ongoy ongoi, Nuestra Señora de Ongoy
location: -13.40312986 -73.66838653
location: -13 24 11.26800 -073 40 06.19320
Coordinates from: http://en.wikipedia.org/wiki/Ongoy_District
Levillier 1921-26 v9 169
AGI Lima 464
identifier: http://logarandes.org/place/220
1
Google sat
Kohut
12/8/2015
0